<script>
  import {Select} from 'element-ui'

  export default {
    name: 'ZySelect',
    mixins: [Select],
    created() {
    },
    mounted() {
      this.$refs.reference.$on('input', value => this.handleQueryChange(value))
    },
    watch: {},
    methods: {}
  }
</script>



