<template>
  <span v-bind="$attrs"
        :aria-hidden="!title ? true : null"
        :aria-label="title ? true : null"
        class="material-design-icon printer-outline-icon"
        role="img"
        @click="$emit('click', $event)">
    <svg :fill="fillColor"
         class="material-design-icon__svg"
         :width="size"
         :height="size"
         viewBox="0 0 24 24">
      <path d="M19 8C20.66 8 22 9.34 22 11V17H18V21H6V17H2V11C2 9.34 3.34 8 5 8H6V3H18V8H19M8 5V8H16V5H8M16 19V15H8V19H16M18 15H20V11C20 10.45 19.55 10 19 10H5C4.45 10 4 10.45 4 11V15H6V13H18V15M19 11.5C19 12.05 18.55 12.5 18 12.5C17.45 12.5 17 12.05 17 11.5C17 10.95 17.45 10.5 18 10.5C18.55 10.5 19 10.95 19 11.5Z">
        <title v-if="title">{{ title }}</title>
      </path>
    </svg>
  </span>
</template>

<script>
export default {
  name: "PrinterOutlineIcon",
  emits: ['click'],
  props: {
    title: {
      type: String,
    },
    fillColor: {
      type: String,
      default: "currentColor"
    },
    size: {
      type: Number,
      default: 24
    }
  }
}
</script>