
<template>
  <svg width="1em" height="1em" viewBox="0 0 24 24"><path d="M9 20.42l-6.21-6.21l2.83-2.83L9 14.77l9.88-9.89l2.83 2.83L9 20.42z" fill="currentColor"></path></svg>
</template>

<script>
export default {
  name: 'MdiCheckBold'
}
</script>