
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function Eosunfold_lessFilled({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><path d="M7.41 18.59L8.83 20 12 16.83 15.17 20l1.41-1.41L12 14l-4.59 4.59zm9.18-13.18L15.17 4 12 7.17 8.83 4 7.41 5.41 12 10l4.59-4.59z"/></svg>
    );
};

export default Eosunfold_lessFilled;
