
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function Eossettings_overscanFilled({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><path d="M12.01 5.5L10 8h4l-1.99-2.5zM18 10v4l2.5-1.99L18 10zM6 10l-2.5 2.01L6 14v-4zm8 6h-4l2.01 2.5L14 16zm7-13H3c-1.1 0-2 .9-2 2v14c0 1.1.9 2 2 2h18c1.1 0 2-.9 2-2V5c0-1.1-.9-2-2-2zm0 16.01H3V4.99h18v14.02z"/></svg>
    );
};

export default Eossettings_overscanFilled;
