
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function EosmedicationOutlined({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><path d="M10.5,15H8v-3h2.5V9.5h3V12H16v3h-2.5v2.5h-3V15z M19,8v11c0,1.1-0.9,2-2,2H7c-1.1,0-2-0.9-2-2V8c0-1.1,0.9-2,2-2h10 C18.1,6,19,6.9,19,8z M17,8H7v11h10V8z M18,3H6v2h12V3z"/></svg>
    );
};

export default EosmedicationOutlined;
