
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function EosmedicationFilled({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><rect height="2" width="12" x="6" y="3"/><path d="M17,6H7C5.9,6,5,6.9,5,8v11c0,1.1,0.9,2,2,2h10c1.1,0,2-0.9,2-2V8C19,6.9,18.1,6,17,6z M16,15h-2.5v2.5h-3V15H8v-3h2.5 V9.5h3V12H16V15z"/></svg>
    );
};

export default EosmedicationFilled;
