
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function Eosmedical_servicesOutlined({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><path d="M20,6h-4V4c0-1.1-0.9-2-2-2h-4C8.9,2,8,2.9,8,4v2H4C2.9,6,2,6.9,2,8v12c0,1.1,0.9,2,2,2h16c1.1,0,2-0.9,2-2V8 C22,6.9,21.1,6,20,6z M10,4h4v2h-4V4z M20,20H4V8h16V20z"/><polygon points="13,10 11,10 11,13 8,13 8,15 11,15 11,18 13,18 13,15 16,15 16,13 13,13"/></svg>
    );
};

export default Eosmedical_servicesOutlined;
