
// GENERATED BY ./scripts/iconScript.ts

import * as React from 'react';
import { IconProps, valuesMap } from '../helper';
import { flipFunction } from '../flipFunction';
import classNames from 'classnames';

function Eosgrid_viewFilled({size = "m", color = "black", rotate = 0, horizontalFlip = false, verticalFlip = false, className}: IconProps) {
    const sizeString: string = size.toString()
    if(Object.keys(valuesMap).includes(sizeString)) {
        size = valuesMap[size]
    }
    const { scaleX, scaleY, translateX, translateY } = flipFunction({horizontalFlip,verticalFlip})
    const classString = classNames(className);
return (
      <svg className={classString} data-testid="eos-svg-component" transform={`rotate(${rotate}, 12, 12) translate(${translateX}, ${translateY}) scale(${scaleX}, ${scaleY})`} fill={color} width={size} height={size} xmlns="http://www.w3.org/2000/svg" viewBox="0 0 24 24"><path d="M3 3v8h8V3H3zm6 6H5V5h4v4zm-6 4v8h8v-8H3zm6 6H5v-4h4v4zm4-16v8h8V3h-8zm6 6h-4V5h4v4zm-6 4v8h8v-8h-8zm6 6h-4v-4h4v4z"/></svg>
    );
};

export default Eosgrid_viewFilled;
