
<template>
  <div class="ScadaListRoot">
    <scada-display httpProp="http://199.199.68.108:25098" wsSocket="ws://199.199.68.108:25098"></scada-display>
  </div>
</template>

<script>
export default {
  name: "ScadaListRoot",
  components: {

  },
  data() {
    return {
    }
  },
  created() {

  },
  methods: {
  }
};
</script>

<style scoped>
.ScadaListRoot{
  width: 100%;
  height: 100%;
}
</style>
