import * as React from "react";
import { render, screen, fireEvent, cleanup } from "@testing-library/react";

describe("<Padding /> Rendering >", () => {
  test.todo(`Should render the component in the dom`);
});

describe("<Padding /> Actions >", () => {
  test.todo(
    `Should not be able to set the value to one less than the minValue prop`
  );

  test.todo(
    `Should not be able to set the value to one more than the maxValue prop`
  );

  test.todo(
    `Should update the padding to the value when the slider has changed`
  );
});

describe("<Padding /> Events >", () => {
  test.todo(`Should trigger the onChange() event when the setting changes`);
});

describe("<Padding /> Hooks >", () => {
  test.skip(`Should trigger the _onPaddingChange_ plugin hook when the setting changes`, () => {});

  test.skip(`Should trigger the _onPaddingRender_ plugin hook when the component is being rendered`, () => {});
});
