<template>
  <div id="unit" class="flex-row">
    <div class="binary-left" style="width: 50%" >
      <gas-loss-operate v-ref:operate ></gas-loss-operate>
    </div>
    <div class="binary-right" style="overflow-y: auto;width:50%" >
      <gas-loss-records  :showMessage.sync="showAddMssage"
                        v-ref:records></gas-loss-records>
<!--      <div  class="auto">-->
<!--        <upload  cols="col-sm-12" isremark="true" fusetype="气损收费"></upload>-->
<!--      </div>-->
    </div>
  </div>
</template>

<script>
  export default {
    title: '气损收费',
    name: 'gasLossManage',
    data () {
      return {
        showupload: false,
        showAddMssage: false,
        showItem: false
      }
    },
    ready () {
    },
    methods: {
    },
    events: {
      // 重新查询
      'refresh' () {
        this.$refs.records.search()
      }
    }
  }
</script>

<style lang="less">

</style>
