<template>
  <div>
    <v-container>
      <h1 class="headline">Faq</h1>
    </v-container>
  </div>
</template>

<script>
  export default {
    components: {
    },
    data() {
      return {}
    },
    mounted: function () {},

    methods: {}
  }

</script>
