<template>
  <div class="select-overspread repair-bg auto" style="padding-bottom:5px;">

  </div>
</template>

<script>
  import {HttpResetClass} from 'vue-client'
  import Vue from 'vue'
  export default {
    title: 'test',
    props: ['msg'],
    data () {
      return {
        data:{
          "燃气表": {
            "index": 1,
            "items": {
              "控制器气量": {
                "index": 11,
                "type": "string"
              },
              "燃气表使用日期": {
                "index": 12,
                "type": "date"
              },
              "工作状态异常": {
                "index": 13,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "包裹": {
                "index": 14,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "封闭": {
                "index": 15,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "油污": {
                "index": 16,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "长通表": {
                "index": 17,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "死表": {
                "index": 18,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "表不过气": {
                "index": 19,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "燃气表照片": {
                "index": 20,
                "type": "picture"
              }
            }
          },
          "流量计": {
            "index": 2,
            "items": {
              "型号": {
                "index": 1,
                "type": "string"
              },
              "厂家": {
                "index": 2,
                "type": "string"
              },
              "校验日期": {
                "index": 3,
                "type": "date"
              },
              "表号": {
                "index": 4,
                "type": "string"
              },
              "表基数": {
                "index": 5,
                "type": "string"
              },
              "控制部分气量": {
                "index": 6,
                "type": "string"
              },
              "流量计剩余气量": {
                "index": 7,
                "type": "string"
              },
              "运行环境": {
                "index": 8,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "异常",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "良好",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "温度 ℃": {
                "index": 9,
                "type": "string"
              },
              "压力 kPa": {
                "index": 10,
                "type": "string"
              },
              "瞬时工况 m³/h": {
                "index": 11,
                "type": "string"
              },
              "瞬时标况 Nm³/h": {
                "index": 12,
                "type": "string"
              },
              "强磁": {
                "index": 13,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "包裹": {
                "index": 14,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "油污": {
                "index": 15,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "正常运行": {
                "index": 16,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "远传功能": {
                "index": 17,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "流量计照片": {
                "index": 18,
                "type": "picture"
              },
              "检定证书照片": {
                "index": 19,
                "type": "picture"
              }
            }
          },
          "灶具": {
            "index": 3,
            "items": {
              "品牌": {
                "index": 1,
                "type": "string"
              },
              "灶眼数": {
                "index": 2,
                "type": "string"
              },
              "数量(台)": {
                "index": 3,
                "type": "string"
              },
              "灶具使用日期": {
                "index": 4,
                "type": "date"
              },
              "灶具软管使用日期": {
                "index": 5,
                "type": "date"
              },
              "气源匹配": {
                "index": 6,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "点火枪": {
                "index": 7,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "异常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "鼓风异常": {
                "index": 8,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "连接方式": {
                "index": 9,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "不锈钢波纹管",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "防爆挠性管",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "橡胶软管",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "灶具照片": {
                "index": 10,
                "type": "picture"
              },
              "灶具照片2": {
                "index": 11,
                "type": "picture"
              },
              "灶具照片3": {
                "index": 12,
                "type": "picture"
              }
            }
          },
          "锅炉": {
            "index": 4,
            "items": {
              "品牌": {
                "index": 1,
                "type": "string"
              },
              "数量": {
                "index": 2,
                "type": "string"
              },
              "总吨位": {
                "index": 3,
                "type": "string"
              },
              "锅炉使用日期": {
                "index": 4,
                "type": "date"
              },
              "锅炉类型": {
                "index": 5,
                "type": "selector",
                "checkmust": true,
                "multiple": false,
                "options": [
                  {
                    "data": "锅炉",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "大锅灶",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "其他",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "年检合格": {
                "index": 6,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "燃气设施压力 kPa": {
                "index": 7,
                "type": "string"
              },
              "燃气运行压力 kPa": {
                "index": 8,
                "type": "string"
              },
              "热功率 MW": {
                "index": 9,
                "type": "string"
              },
              "自然通风": {
                "index": 10,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "异常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "设备共振": {
                "index": 11,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "无",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "有",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "连接设备": {
                "index": 12,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "硬链接",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "软连接",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "校验日期": {
                "index": 13,
                "type": "date"
              },
              "检定证书照片": {
                "index": 14,
                "type": "picture"
              },
              "锅炉照片": {
                "index": 15,
                "type": "picture"
              },
              "锅炉照片2": {
                "index": 16,
                "type": "picture"
              },
              "锅炉照片3": {
                "index": 17,
                "type": "picture"
              }
            }
          },
          "报警器": {
            "index": 5,
            "checkmust": true,
            "items": {
              "品牌": {
                "index": 1,
                "type": "string"
              },
              "报警器使用日期": {
                "index": 2,
                "type": "date"
              },
              "探头数量": {
                "index": 3,
                "type": "string"
              },
              "报警器校验日期": {
                "index": 4,
                "type": "date"
              },
              "年检合格": {
                "index": 5,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "检定证书拍照": {
                "index": 6,
                "type": "picture"
              },
              "运行状态": {
                "index": 7,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "异常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "防爆设施(穿线管、开关)": {
                "index": 8,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "无",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "有",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "风机联动": {
                "index": 9,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              }
            }
          },
          "燃气管道": {
            "index": 6,
            "items": {
              "燃气管道": {
                "index": 1,
                "type": "selector",
                "multiple": true,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "包裹",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "异物悬挂、缠绕",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "封闭",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "私改",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "腐蚀",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "支架异常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "油污",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "踩踏",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "漏气",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  },
                  {
                    "data": "晃动",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              }
            }
          },
          "漏气检查": {
            "index": 7,
            "items": {
              "外漏检查": {
                "index": 1,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "漏气",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "内漏检查": {
                "index": 2,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "合格",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "不合格",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "测试压力 pa": {
                "index": 3,
                "type": "string"
              }
            }
          },
          "阀门": {
            "index": 8,
            "items": {
              "表前阀": {
                "index": 1,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "漏气",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "灶前阀": {
                "index": 2,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "不正常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "截至阀": {
                "index": 3,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "不正常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "电磁阀": {
                "index": 4,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "正常",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "不正常",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              }
            }
          },
          "自闭阀": {
            "index": 9,
            "items": {
              "自闭阀品牌": {
                "index": 1,
                "type": "string"
              },
              "自闭阀型号": {
                "index": 2,
                "type": "string"
              },
              "自闭阀使用日期": {
                "index": 3,
                "type": "date"
              }
            }
          },
          "保险": {
            "index": 10,
            "items": {
              "购买保险": {
                "index": 1,
                "type": "selector",
                "checkmust": true,
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "保险使用日期": {
                "index": 2,
                "type": "date"
              }
            }
          },
          "热水器": {
            "index": 11,
            "items": {
              "热水器设备品牌": {
                "index": 1,
                "type": "string"
              },
              "热水器设备型号": {
                "index": 2,
                "type": "string"
              },
              "热水器使用日期": {
                "index": 3,
                "type": "date"
              },
              "热水器漏气": {
                "index": 4,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "一级隐患"
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "热水器烟道": {
                "index": 5,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "直排",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "水平",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "倾斜",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "强排",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "未接到室外",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "烟道破损",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "与墙体间未密封",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "未安装烟道",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "一级隐患"
                  }
                ]
              },
              "热水器软管材质": {
                "index": 6,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "橡胶",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "铝塑",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "金属",
                    "isdefect": false,
                    "isdefault": false
                  }
                ]
              },
              "热水器软管使用日期": {
                "index": 7,
                "type": "date"
              },
              "热水器软管长度(米)": {
                "index": 8,
                "type": "string"
              },
              "热水器照片": {
                "index": 9,
                "type": "picture"
              },
              "热水器用户档案编号": {
                "index": 10,
                "type": "number",
                "readonly": true,
                "isshow": false
              }
            }
          },
          "壁挂炉": {
            "index": 12,
            "items": {
              "壁挂炉设备品牌": {
                "index": 1,
                "type": "string"
              },
              "壁挂炉设备型号": {
                "index": 2,
                "type": "string"
              },
              "壁挂炉使用日期": {
                "index": 3,
                "type": "date"
              },
              "壁挂炉烟道": {
                "index": 4,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "直排",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "水平",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "倾斜",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "强排",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "未接到室外",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "烟道破损",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "与墙体间未密封",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "二级隐患"
                  },
                  {
                    "data": "未安装烟道",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "一级隐患"
                  }
                ]
              },
              "壁挂炉软管材质": {
                "index": 5,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "金属",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "铝塑",
                    "isdefect": false,
                    "isdefault": false
                  },
                  {
                    "data": "橡胶",
                    "isdefect": true,
                    "isdefault": false
                  }
                ]
              },
              "壁挂炉软管使用日期": {
                "index": 6,
                "type": "date"
              },
              "壁挂炉软管长度(米)": {
                "index": 7,
                "type": "string"
              },
              "壁挂炉用户档案编号": {
                "index": 8,
                "type": "number",
                "readonly": true,
                "isshow": false
              },
              "壁挂炉照片": {
                "index": 9,
                "type": "picture"
              }
            }
          },
          "穿墙管": {
            "index": 13,
            "checkmust": true,
            "items": {
              "穿墙管符合规范": {
                "index": 1,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "否",
                    "isdefect": false
                  }
                ]
              },
              "未按规范增加套管": {
                "index": 2,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "套管尺寸不符合规范": {
                "index": 3,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "套管材质不符合规范": {
                "index": 4,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "未按规范封堵,填充": {
                "index": 5,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "是",
                    "isdefault": false
                  },
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  }
                ]
              },
              "其他": {
                "index": 6,
                "type": "string"
              }
            }
          },
          "其他隐患": {
            "index": 14,
            "items": {
              "操作人员居住": {
                "index": 1,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "第二火源": {
                "index": 2,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "私自增容": {
                "index": 3,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "密闭或半密闭场所无防爆照明设施": {
                "index": 4,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "密闭或半密闭场所燃气具无熄火保护功能": {
                "index": 5,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "燃气设施场所堆放易燃易爆物品": {
                "index": 6,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "燃气设施场所存在第二火源": {
                "index": 7,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "插座与燃气设施安全距离不足": {
                "index": 8,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "用气场所通风不良": {
                "index": 9,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "轴流风机故障": {
                "index": 10,
                "type": "selector",
                "multiple": false,
                "options": [
                  {
                    "data": "否",
                    "isdefect": false,
                    "isdefault": true
                  },
                  {
                    "data": "是",
                    "isdefect": true,
                    "isdefault": false,
                    "level": "未定级隐患"
                  }
                ]
              },
              "其他隐患1": {
                "index": 11,
                "type": "string"
              },
              "其他隐患1照片1": {
                "index": 12,
                "type": "picture"
              },
              "其他隐患1照片2": {
                "index": 13,
                "type": "picture"
              },
              "其他隐患2": {
                "index": 14,
                "type": "string"
              },
              "其他隐患2照片1": {
                "index": 15,
                "type": "picture"
              },
              "其他隐患2照片2": {
                "index": 16,
                "type": "picture"
              }
            }
          },
          "特殊用户": {
            "index": 15,
            "items": {
              "特殊用户备注": {
                "index": 1,
                "type": "string"
              }
            }
          }
        }
      }
    },
    ready(){
      for (const item in this.data) {
        for (const item1 in this.data[item].items) {
          // for (const item2 in this.data[item].items[item1]) {
          //tag
          // }
        }


      }
    },
    methods: {

    }
  }
</script>
