export const RATIO = 0.5;
export const DISTANCE = 150;
export const DURATION = 300;

export const DEFAULT_MODAL_TYPE = "bottom";
export const DEFAULT_ANIMATION_TYPE = "slide";
export const DEFAULT_OVERLAY_COLOR = "rgba(0, 0, 0, 0.65)";

export const emptyFunc = () => {
  return;
};
