export const gHeaderHeight = 40;
export const gDotHeaderHeight = 6;
export const gTabBarHeaderHeight = 52;
export const gIndicatorWidth = 28;
export const gIndicatorHeight = 4;
export const gIndicatorBorderRadius = 2;
export const gAnimatedDuration = 250;
