const baseUrl = "../nb/components";

// type mappingType = {
//   title: string;
//   description: string;
//   basic: React.Component;
//   components: {
//     component: any;
//     title: string;
//     description: string;
//   }[];
// };

export const mapping = {
  Actionsheet: {
    title: "Actionsheet",
    description: "",
    doclink: "https://docs.nativebase.io/action-sheet",
    basic: require("../components/NativeBaseComponents/Actionsheet"),
    components: [
      {
        component: require("../nb/components/composites/Actionsheet/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Actionsheet/DisableOverlay"),
        title: "DisableOverlay",
        description: "",
      },
      {
        component: require("../nb/components/composites/Actionsheet/Icon"),
        title: "Icon",
        description: "",
      },
      {
        component: require("../nb/components/composites/Actionsheet/Usage"),
        title: "Usage",
        description: "",
      },
    ],
  },
  ErrorTest: {
    title: "ErrorTest",
    description: "",
    doclink: "https://docs.nativebase.io/action-sheet",
    basic: require("../components/NativeBaseComponents/ErrorTest"),
    components: [
      {
        component: require("../nb/components/composites/ErrorTest/EventError"),
        title: "Event Error",
        description: "",
      },
      {
        component: require("../nb/components/composites/ErrorTest/UIError"),
        title: "UI Error",
        description: "",
      }
    ],
  },
  Alert: {
    title: "Alert",
    description: "",
    doclink: "https://docs.nativebase.io/alert",
    basic: require("../components/NativeBaseComponents/Alert"),
    components: [
      {
        component: require("../nb/components/composites/Alert/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Alert/action"),
        title: "Action",
        description: "",
      },
      {
        component: require("../nb/components/composites/Alert/colorScheme"),
        title: "Color Scheme",
        description: "",
      },
      {
        component: require("../nb/components/composites/Alert/composition"),
        title: "Composition",
        description: "",
      },
      // {
      // 	component: require("../nb/components/composites/Alert/knobEnabled"),
      // 	title: "Knob Enabled",
      // 	description: "",
      // },
      // {
      // 	component: require("../nb/components/composites/Alert/"),
      // 	title: "",
      // 	description: "",
      // },
      {
        component: require("../nb/components/composites/Alert/status"),
        title: "Status",
        description: "",
      },
      {
        component: require("../nb/components/composites/Alert/variant"),
        title: "Variant",
        description: "",
      },
      {
        component: require("../nb/components/composites/Alert/usage"),
        title: "Usage",
        description: "",
      },
    ],
  },
  AlertDialog: {
    title: "AlertDialog",
    description: "",
    doclink: "https://docs.nativebase.io/alert-dialog",
    basic: require("../components/NativeBaseComponents/AlertDialog"),
    components: [
      {
        component: require("../nb/components/composites/AlertDialog/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/AlertDialog/Transition"),
        title: "Transition",
        description: "",
      },
    ],
  },
  Avatar: {
    title: "Avatar",
    description: "",
    doclink: "https://docs.nativebase.io/avatar",
    basic: require("../components/NativeBaseComponents/Avatar"),
    components: [
      {
        component: require("../nb/components/composites/Avatar/AvatarBadge"),
        title: "Avatar Badge",
        description: "",
      },
      {
        component: require("../nb/components/composites/Avatar/AvatarGroup"),
        title: "Avatar Group",
        description: "",
      },
      {
        component: require("../nb/components/composites/Avatar/Fallback"),
        title: "Fallback",
        description: "",
      },
      {
        component: require("../nb/components/composites/Avatar/size"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/composites/Avatar/usage"),
        title: "Usage",
        description: "",
      },
      // {
      // 	component: require("../nb/components/composites/Avatar/knobEnabled"),
      // 	title: "Knob Enabled",
      // 	description: "",
      // },
    ],
  },
  Badge: {
    title: "Badge",
    description: "",
    doclink: "https://docs.nativebase.io/badge",
    basic: require("../components/NativeBaseComponents/Badge"),
    components: [
      {
        component: require("../nb/components/composites/Badge/color"),
        title: "Color",
        description: "",
      },
      {
        component: require("../nb/components/composites/Badge/composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Badge/variants"),
        title: "Variants",
        description: "",
      },
      {
        component: require("../nb/components/composites/Badge/usage"),
        title: "Usage",
        description: "",
      },
    ],
  },
  Button: {
    title: "Button",
    description: "Primitive Element",
    doclink: "https://docs.nativebase.io/button",
    basic: require("../components/NativeBaseComponents/Button"),
    components: [
      {
        component: require("../nb/components/primitives/Button/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/ButtonGroup/basic"),
        title: "ButtonGroup",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Button/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Button/icons"),
        title: "Icons",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Button/loading"),
        title: "Loading button",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Button/sizes"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Button/variants"),
        title: "variants",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Button/WithRef"),
      // 	title: "With References",
      // 	description: "",
      // },
    ],
  },
  Box: {
    title: "Box",
    description: "",
    doclink: "https://docs.nativebase.io/box",
    basic: require("../components/NativeBaseComponents/Box"),
    components: [
      {
        component: require("../nb/components/primitives/Box/basic"),
        title: "Basic",
        description: "",
      },
      // {
      //   component: require('../nb/components/primitives/Box/composition'),
      //   title: 'Composition',
      //   description: '',
      // },
      {
        component: require("../nb/components/primitives/Box/LinearGrad"),
        title: "Linear Gradient",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Box/composition-card"),
        title: "Composition Card",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Box/composition-card1"),
        title: "Composition Card 1",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Box/composition-card2"),
        title: "Composition Card 2",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Box/composition-card3"),
        title: "Composition Card 3",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Box/composition-shoes-card"),
        title: "Composition ShoesCard",
        description: "",
      },
    ],
  },
  Center: {
    title: "Center",
    description: "",
    doclink: "https://docs.nativebase.io/center",
    basic: require("../components/NativeBaseComponents/Center"),
    components: [
      {
        component: require("../nb/components/composites/Center/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Center/SquareCircle"),
        title: "Square Circle",
        description: "",
      },
      {
        component: require("../nb/components/composites/Center/WithIcons"),
        title: "With Icons",
        description: "",
      },
    ],
  },
  CheckBox: {
    title: "CheckBox",
    description: "Primitive Element",
    doclink: "https://docs.nativebase.io/checkbox",
    basic: require("../components/NativeBaseComponents/CheckBox"),
    components: [
      {
        component: require("../nb/components/primitives/Checkbox/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/checkboxGroup"),
        title: "CheckboxGroup",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/controlledCheckbox"),
        title: "Controlled Checkbox",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/customColor"),
        title: "CustomColor CheckBox",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/customIcon"),
        title: "CustomIcon CheckBox",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/disabled"),
        title: "Disabled CheckBox",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/FormControlled"),
        title: "FormControlled CheckBox",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/invalid"),
        title: "Invalid CheckBox",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Checkbox/playground"),
      // 	title: "CheckBox",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/Checkbox/size"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Checkbox/uncontrolledCheckbox"),
        title: "UnControlled CheckBox",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Checkbox/withRef"),
      // 	title: "CheckBox",
      // 	description: "",
      // },
    ],
  },
  Column: {
    title: "Column",
    description: "Renders your data vertically",
    doclink: "https://docs.nativebase.io/v-stack",
    basic: require("../components/NativeBaseComponents/Column"),
    components: [
      {
        component: require("../nb/components/primitives/Column/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  Divider: {
    title: "Divider",
    description: "",
    doclink: "https://docs.nativebase.io/divider",
    basic: require("../components/NativeBaseComponents/Divider"),
    components: [
      {
        component: require("../nb/components/composites/Divider/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Divider/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Divider/Orientation"),
        title: "Orientation",
        description: "",
      },
    ],
  },
  Fab: {
    title: "Fab",
    description: "",
    doclink: "https://docs.nativebase.io/fab",
    basic: require("../components/NativeBaseComponents/Fab"),
    components: [
      {
        component: require("../nb/components/composites/Fab/Kitchensink-Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Fab/Kitchensink-CustomPosition"),
        title: "Custom Position",
        description: "",
      },
      {
        component: require("../nb/components/composites/Fab/Kitchensink-Placement"),
        title: "Placement",
        description: "",
      },
    ],
  },
  Flex: {
    title: "Flex",
    description: "Box with display='Flex'",
    doclink: "https://docs.nativebase.io/flex",
    basic: require("../components/NativeBaseComponents/Flex"),
    components: [
      {
        component: require("../nb/components/primitives/Flex/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Flex/spacer"),
        title: "Spacer",
        description: "",
      },
    ],
  },
  FlatList: {
    title: "FlatList",
    description: "",
    doclink: "https://docs.nativebase.io/flat-list",
    basic: require("../components/NativeBaseComponents/FlatList"),
    components: [
      {
        component: require("../nb/components/basic/FlatList/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  FormControl: {
    title: "FormControl",
    description: "",
    doclink: "https://docs.nativebase.io/form-control",
    basic: require("../components/NativeBaseComponents/FormControl"),
    components: [
      {
        component: require("../nb/components/composites/FormControl/Usage"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/FormControl/CustomStyle"),
        title: "Custom Styles",
        description: "",
      },
    ],
  },
  Heading: {
    title: "Heading",
    description: "It shows the Title",
    doclink: "https://docs.nativebase.io/heading",
    basic: require("../components/NativeBaseComponents/Heading"),
    components: [
      {
        component: require("../nb/components/primitives/Heading/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Heading/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Heading/OverridenStyle"),
        title: "OverridenStyle",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Heading/Sizes"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Heading/Truncate"),
        title: "Truncate",
        description: "",
      },
    ],
  },
  HStack: {
    title: "HStack",
    description: "Rows structure",
    doclink: "https://docs.nativebase.io/h-stack",
    basic: require("../components/NativeBaseComponents/HStack"),
    components: [
      {
        component: require("../nb/components/primitives/HStack/basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  Icon: {
    title: "Icon",
    description: "Show Icon in NativeBase",
    doclink: "https://docs.nativebase.io/icon",
    basic: require("../components/NativeBaseComponents/Icon"),
    components: [
      {
        component: require("../nb/components/primitives/Icon/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Icon/CreateIcon"),
        title: "Create Icon",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Icon/Sizes"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Icon/CustomIcon"),
        title: "Custom Icon",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Icon/AllIcons"),
        title: "All Icons",
        description: "",
      },
    ],
  },
  IconButton: {
    title: "IconButton",
    description: "",
    doclink: "https://docs.nativebase.io/icon-button",
    basic: require("../components/NativeBaseComponents/IconButton"),
    components: [
      {
        component: require("../nb/components/composites/IconButton/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/IconButton/Sizes"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/composites/IconButton/SVGIcon"),
        title: "SVGIcon",
        description: "",
      },
      {
        component: require("../nb/components/composites/IconButton/Variant"),
        title: "Variant",
        description: "",
      },
    ],
  },
  Image: {
    title: "Image",
    description: "Show image in NativeBase",
    doclink: "https://docs.nativebase.io/image",
    basic: require("../components/NativeBaseComponents/Image"),
    components: [
      {
        component: require("../nb/components/primitives/Image/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Image/BorderRadius"),
        title: "BorderRadius",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Image/FallbackSupport"),
        title: "FallbackSupport",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Image/Sizes"),
        title: "Sizes",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Image/WithRef"),
      // 	title: "WithRef",
      // 	description: "",
      // },
    ],
  },
  Input: {
    title: "Input",
    description: "",
    doclink: "https://docs.nativebase.io/input",
    basic: require("../components/NativeBaseComponents/Input"),
    components: [
      {
        component: require("../nb/components/primitives/Input/Basic"),
        title: "Basic Input",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Input/Controlled"),
      // 	title: "Controlled Input",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/Input/Elements"),
        title: "Elements",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Input/FormControlled"),
        title: "FormControlled",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Input/Masked"),
      // 	title: "Masked",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/Input/Size"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Input/Variant"),
        title: "Variant",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Input/Addons"),
        title: "Addons",
        description: "",
      },
    ],
  },
  KeyboardAvoidingView: {
    title: "KeyboardAvoidingView",
    description: "",
    doclink: "https://docs.nativebase.io/keyboard-avoiding-view",
    basic: require("../components/NativeBaseComponents/KeyboardAvoidingView"),
    components: [
      {
        component: require("../nb/components/basic/KeyboardAvoidingView/Kitchensink-Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  Link: {
    title: "Link",
    description: "Used to navigate",
    doclink: "https://docs.nativebase.io/link",
    basic: require("../components/NativeBaseComponents/Link"),
    components: [
      {
        component: require("../nb/components/primitives/Link/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Link/CompositeLink"),
        title: "Composite Link",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Link/CustomOnPress"),
        title: "Custom Pressable link",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Link/ExternalLink"),
        title: "External link",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Link/UnderlineLink"),
        title: "Underline Link",
        description: "",
      },
    ],
  },
  // List: {
  // 	title: "List",
  // 	description: "",
  // doclink: 'https://docs.nativebase.io/list',
  // 	// basic: require("../components/NativeBaseComponents/List"),
  // 	components: [
  // 		{
  // 			component: require("../nb/components/primitives/List/Basic"),
  // 			title: "Basic",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/OrderedList"),
  // 			title: "Ordered list",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/UnorderedList"),
  // 			title: "Unordered list",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/ListWithIcon"),
  // 			title: "ListWithIcon",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/PressableList"),
  // 			title: "Pressable list",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/StylingList"),
  // 			title: "Styling list",
  // 			description: "",
  // 		},
  // 		{
  // 			component: require("../nb/components/primitives/List/VirtualizedList"),
  // 			title: "Virtualized list",
  // 			description: "",
  // 		},
  // 	],
  // },
  Menu: {
    title: "Menu",
    description: "",
    doclink: "https://docs.nativebase.io/menu",
    basic: require("../components/NativeBaseComponents/Menu"),
    components: [
      {
        component: require("../nb/components/composites/Menu/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Menu/MenuPositions"),
        title: "Menu Positions",
        description: "",
      },
      {
        component: require("../nb/components/composites/Menu/Group"),
        title: "Menu Group",
        description: "",
      },
      {
        component: require("../nb/components/composites/Menu/MenuOptionsGroup"),
        title: "Menu options Group",
        description: "",
      },
    ],
  },
  Modal: {
    title: "Modal",
    description: "",
    doclink: "https://docs.nativebase.io/modal",
    basic: require("../components/NativeBaseComponents/Modal"),
    components: [
      {
        component: require("../nb/components/composites/Modal/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Modal/ModalPlacement"),
        title: "ModalPlacement",
        description: "",
      },
      {
        component: require("../nb/components/composites/Modal/ModalRefEg"),
        title: "Modal Ref",
        description: "",
      },
      {
        component: require("../nb/components/composites/Modal/ModalWithAvoidKeyboard"),
        title: "Avoiding keyboard with Modal ",
        description: "",
      },
      {
        component: require("../nb/components/composites/Modal/MultipleModal"),
        title: "Multiple Modal",
        description: "",
      },
      {
        component: require("../nb/components/composites/Modal/Size"),
        title: "Size",
        description: "",
      },
    ],
  },
  Popover: {
    title: "Popover",
    description: "",
    doclink: "https://docs.nativebase.io/popover",
    basic: require("../components/NativeBaseComponents/Popover"),
    components: [
      {
        component: require("../nb/components/composites/Popover/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Popover/PopoverPositions"),
        title: "Popover Positions",
        description: "",
      },
      {
        component: require("../nb/components/composites/Popover/RefEg"),
        title: "Ref Example",
        description: "",
      },
    ],
  },
  Pressable: {
    title: "Pressable",
    description: "",
    doclink: "https://docs.nativebase.io/pressable",
    basic: require("../components/NativeBaseComponents/Pressable"),
    components: [
      {
        component: require("../nb/components/primitives/Pressable/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Pressable/Events"),
        title: "Events",
        description: "",
      },
    ],
  },
  Progress: {
    title: "Progress",
    description: "",
    doclink: "https://docs.nativebase.io/progress",
    basic: require("../components/NativeBaseComponents/Progress"),
    components: [
      {
        component: require("../nb/components/composites/Progress/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Progress/ColorScheme"),
        title: "Color schemes",
        description: "",
      },
      {
        component: require("../nb/components/composites/Progress/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Progress/CustomBgColor"),
        title: "Custom BgColor",
        description: "",
      },
      {
        component: require("../nb/components/composites/Progress/Flat"),
        title: "Flat",
        description: "",
      },
      {
        component: require("../nb/components/composites/Progress/Sizes"),
        title: "Sizes",
        description: "",
      },
    ],
  },
  Radio: {
    title: "Radio",
    description: "",
    doclink: "https://docs.nativebase.io/radio",
    basic: require("../components/NativeBaseComponents/Radio"),
    components: [
      {
        component: require("../nb/components/primitives/Radio/controlledRadio"),
        title: "Controlled Radio",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/formControlled"),
        title: "Form Controlled",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/uncontrolledRadio"),
        title: "Uncontrolled Radio",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/customColor"),
        title: "Custom Color",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/customIcon"),
        title: "Custom con",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/disabled"),
        title: "Disabled",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Radio/invalid"),
        title: "Invalid",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Radio/playground"),
      // 	title: "Playground",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/Radio/size"),
        title: "Size",
        description: "",
      },
      // {
      //   component: require('../nb/components/primitives/Radio/withRef'),
      //   title: 'with Ref',
      //   description: '',
      // },
    ],
  },
  ScrollView: {
    title: "ScrollView",
    description: "",
    doclink: "https://docs.nativebase.io/scrollview",
    basic: require("../components/NativeBaseComponents/ScrollView"),
    components: [
      {
        component: require("../nb/components/basic/ScrollView/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  SectionList: {
    title: "SectionList",
    description: "",
    doclink: "https://docs.nativebase.io/section-list",
    basic: require("../components/NativeBaseComponents/SectionList"),
    components: [
      {
        component: require("../nb/components/basic/SectionList/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  Select: {
    title: "Select",
    description: "",
    doclink: "https://docs.nativebase.io/select",
    basic: require("../components/NativeBaseComponents/Select"),
    components: [
      {
        component: require("../nb/components/primitives/Select/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Select/FormControlled"),
        title: "Form Controlled",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Select/SelectLongList"),
        title: "Long Lists",
        description: "",
      },
    ],
  },
  Skeleton: {
    title: "Skeleton",
    description: "",
    doclink: "https://docs.nativebase.io/skeleton",
    basic: require("../components/NativeBaseComponents/Skeleton"),
    components: [
      {
        component: require("../nb/components/composites/Skeleton/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Skeleton/Color"),
        title: "Color",
        description: "",
      },
      {
        component: require("../nb/components/composites/Skeleton/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Skeleton/isLoaded"),
        title: "IsLoaded",
        description: "",
      },
    ],
  },
  Slider: {
    title: "Slider",
    description: "",
    doclink: "https://docs.nativebase.io/slider",
    basic: require("../components/NativeBaseComponents/Slider"),
    components: [
      {
        component: require("../nb/components/primitives/Slider/color"),
        title: "Color",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/Customized"),
        title: "Customized",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/FormControlled"),
        title: "Form Controlled",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/Size"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/Value"),
        title: "Value",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/Vertical"),
        title: "Vertical",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Slider/usage"),
        title: "Usage",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Slider/Playground"),
      // 	title: "Playground",
      // 	description: "",
      // },
    ],
  },
  Spinner: {
    title: "Spinner",
    description: "",
    doclink: "https://docs.nativebase.io/spinner",
    basic: require("../components/NativeBaseComponents/Spinner"),
    components: [
      {
        component: require("../nb/components/primitives/Spinner/color"),
        title: "Color",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Spinner/duration"),
      // 	title: "Duration",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/Spinner/size"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Spinner/usage"),
        title: "Usage",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Spinner/variant"),
      // 	title: "variant",
      // 	description: "",
      // },
    ],
  },
  Stack: {
    title: "Stack",
    description: "",
    doclink: "https://docs.nativebase.io/stack",
    basic: require("../components/NativeBaseComponents/Stack"),
    components: [
      {
        component: require("../nb/components/primitives/Stack/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Stack/divider"),
        title: "Divider",
        description: "",
      },
    ],
  },
  StatusBar: {
    title: "StatusBar",
    description: "",
    doclink: "https://docs.nativebase.io/status-bar",
    basic: require("../components/NativeBaseComponents/StatusBar"),
    components: [
      {
        component: require("../nb/components/basic/StatusBar/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  Switch: {
    title: "Switch",
    description: "",
    doclink: "https://docs.nativebase.io/switch",
    basic: require("../components/NativeBaseComponents/Switch"),
    components: [
      {
        component: require("../nb/components/primitives/Switch/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Switch/Accessibility"),
        title: "Accessibility",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Switch/ColorSchemes"),
        title: "Color Schemes",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Switch/Sizes"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Switch/SwitchBgColor"),
        title: "Switch BgColor",
        description: "",
      },
      // {
      // 	component: require("../nb/components/primitives/Switch/example"),
      // 	title: "Composite Example",
      // 	description: "",
      // },
    ],
  },
  Tabs: {
    title: "Tabs",
    description: "",
    doclink: "https://docs.nativebase.io/building-tab-view",
    basic: require("../components/NativeBaseComponents/Tabs"),
    components: [
      {
        component: require("../nb/components/composites/Tabs/Colors"),
        title: "Colored Tabs",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/Composition"),
        title: "Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/Controlled"),
        title: "Controlled Tabs",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/FittedTab"),
        title: "Fitted Tab",
        description: "",
      },
      // {
      // 	component: require("../nb/components/composites/Tabs/IconTabs"),
      // 	title: "Icon Tabs",
      // 	description: "",
      // },
      {
        component: require("../nb/components/composites/Tabs/Size"),
        title: "Sizes",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/TabAlignment"),
        title: "Tab Alignment",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/TabBarOnly"),
        title: "Tab Bar Only",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/Usage"),
        title: "Usage",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tabs/Variants"),
        title: "Variants",
        description: "",
      },
    ],
  },
  Text: {
    title: "Text",
    description: "",
    doclink: "https://docs.nativebase.io/text",
    basic: require("../components/NativeBaseComponents/Text"),
    components: [
      {
        component: require("../nb/components/primitives/Text/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Text/ChangingFontSize"),
        title: "Changing Font Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Text/Nested"),
        title: "Nested texts",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Text/Overriden"),
        title: "Overriden Text",
        description: "",
      },
      {
        component: require("../nb/components/primitives/Text/Truncated"),
        title: "Truncated text",
        description: "",
      },
    ],
  },
  TextArea: {
    title: "TextArea",
    description: "",
    doclink: "https://docs.nativebase.io/textarea",
    basic: require("../components/NativeBaseComponents/TextArea"),
    components: [
      {
        component: require("../nb/components/primitives/TextArea/basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/primitives/TextArea/invalid"),
        title: "Invalid",
        description: "",
      },
      {
        component: require("../nb/components/primitives/TextArea/size-kitchensink"),
        title: "Size",
        description: "",
      },
      {
        component: require("../nb/components/primitives/TextArea/value"),
        title: "Value",
        description: "",
      },
    ],
  },
  Toast: {
    title: "Toast",
    description: "",
    doclink: "https://docs.nativebase.io/toast",
    basic: require("../components/NativeBaseComponents/Toast"),
    components: [
      {
        component: require("../nb/components/composites/Toast/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/CloseToast"),
        title: "Close Toast",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/CustomComponent"),
        title: "Custom Component",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/PreventDuplicate"),
        title: "Prevent Duplicate",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/ToastPositions"),
        title: "Toast Positions",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/StatusRecipies"),
        title: "Toast Status",
        description: "",
      },
      {
        component: require("../nb/components/composites/Toast/VariantRecipies"),
        title: "Toast Variants",
        description: "",
      },
    ],
  },
  Tooltip: {
    title: "Tooltip",
    description: "",
    doclink: "https://docs.nativebase.io/tooltip",
    basic: require("../components/NativeBaseComponents/ToolTip"),
    components: [
      {
        component: require("../nb/components/composites/Tooltip/Basic"),
        title: "Basic",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tooltip/CustomTooltip"),
        title: "Custom Tooltip",
        description: "",
      },
      {
        component: require("../nb/components/composites/Tooltip/TooltipPositions"),
        title: "Tooltip Positions",
        description: "",
      },
    ],
  },
  Transitions: {
    title: "Transitions",
    description: "",
    doclink: "https://docs.nativebase.io/transition",
    basic: require("../components/NativeBaseComponents/Transitions"),
    components: [
      {
        component: require("../nb/components/composites/Transitions/Fade"),
        title: "Fade",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/ScaleFade"),
        title: "ScaleFade",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/Slide"),
        title: "Slide",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/SlideComposition"),
        title: "Slide Composition",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/SlideFade"),
        title: "Slide Fade",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/SlideWrapped"),
        title: "Slide Wrapped",
        description: "",
      },
      {
        component: require("../nb/components/composites/Transitions/Stagger"),
        title: "Stagger",
        description: "",
      },
    ],
  },
  View: {
    title: "View",
    description: "",
    doclink: "https://docs.nativebase.io/view",
    basic: require("../components/NativeBaseComponents/View"),
    components: [
      {
        component: require("../nb/components/basic/View/Basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  VStack: {
    title: "VStack",
    description: "",
    doclink: "https://docs.nativebase.io/v-stack",
    basic: require("../components/NativeBaseComponents/VStack"),
    components: [
      {
        component: require("../nb/components/primitives/VStack/basic"),
        title: "Basic",
        description: "",
      },
    ],
  },
  ZStack: {
    title: "ZStack",
    description: "",
    doclink: "https://docs.nativebase.io/z-stack",
    basic: require("../components/NativeBaseComponents/ZStack"),
    components: [
      // {
      // 	component: require("../nb/components/primitives/ZStack/CenterStack"),
      // 	title: "Center Stack",
      // 	description: "",
      // },
      {
        component: require("../nb/components/primitives/ZStack/example"),
        title: "example",
        description: "",
      },
    ],
  },
};
