/* GENERATED FILE */
import * as React from 'react';
import Svg, { Rect, Line, Path } from 'react-native-svg';

import { IconProps } from '../lib';

function Syringe(props: IconProps) {
  return (
    <Svg
      viewBox="0 0 256 256"
      width={props.size}
      height={props.size}
      {...props}
    >
      <Rect width={256} height={256} fill="none" />
      <Line
        x1={184}
        y1={24}
        x2={232}
        y2={72}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Line
        x1={128}
        y1={48}
        x2={208}
        y2={128}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Path
        d="M140,60,50.3,149.7a7.9,7.9,0,0,0-2.3,5.6V208h52.7a7.9,7.9,0,0,0,5.6-2.3L196,116"
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Line
        x1={102}
        y1={98}
        x2={128}
        y2={124}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Line
        x1={74}
        y1={126}
        x2={100}
        y2={152}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Line
        x1={168}
        y1={88}
        x2={208}
        y2={48}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Line
        x1={48}
        y1={208}
        x2={24}
        y2={232}
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
    </Svg>
  );
}

export default Syringe;
