/* GENERATED FILE */
import * as React from 'react';
import Svg, { Rect, Polyline, Path } from 'react-native-svg';

import { IconProps } from '../lib';

function Heartbeat(props: IconProps) {
  return (
    <Svg
      viewBox="0 0 256 256"
      width={props.size}
      height={props.size}
      {...props}
    >
      <Rect width={256} height={256} fill="none" />
      <Polyline
        points="32 128 72 128 88 104 120 152 136 128 160 128"
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
      <Path
        d="M28.1,96c-.1-1.3-.1-2.7-.1-4A52,52,0,0,1,128,72h0A52,52,0,0,1,228,92c0,68-100,124-100,124s-39.9-22.4-69.3-56"
        fill="none"
        stroke={props.color}
        strokeLinecap="round"
        strokeLinejoin="round"
        strokeWidth={8}
      />
    </Svg>
  );
}

export default Heartbeat;
