<script setup>
import xtxBread from '../packages/components/xtx-bread.vue'
import xtxBreadItem from '../packages/components/xtx-bread-item.vue'
</script>

<template>
  <xtx-bread>
    <xtx-bread-item to="/">首页</xtx-bread-item>
    <xtx-bread-item to="/category/1005000">电器</xtx-bread-item>
    <xtx-bread-item>空调</xtx-bread-item>
  </xtx-bread>
</template>

<style scoped lang="less"></style>
