<template>
  <div class="page-header">
    <div class="logo">
      <img src="../assets/img/meka.png">
    </div>
  </div>
</template>

<script>
export default {};
</script>

<style>
.page-header {
  height: 70px;
  box-shadow: rgba(29, 29, 29, 0.07) 0px 10px 60px 0px;
}
.page-header .logo {
  float: left;
  margin-left: 60px;
}
.page-header .logo img {
  margin-top: 10px;
  width: 248px;
  height: 88px;
  margin-left: 5px;
}
.page-header .ui {
  float: left;
  color: #6190e8;
  margin-top: 43px;
  margin-left: 8px;
  font-size: 13px;
}
</style>
