\frac{{\mathrm{d}}^{2}w}{{\mathrm{d}z^{\prime}}^{2}}+(h^{\prime}-\nu(\nu+1){k^{\prime}}^{2}{\operatorname{sn}^{2}}\left(z^{\prime},k^{\prime}\right))w=0