\widetilde{J}_{\nu}\left(x\right)=\left(\frac{2\tanh(\frac{1}{2}\pi\nu)}{\pi\nu}\right)^{\frac{1}{2}}\cos\left(\nu\ln(\tfrac{1}{2}x)-\gamma_{\nu}\right)+O(x^{2})