<template>
  <path
    d="M14.1705 14.5186L15.5705 12.0986C15.6605 11.9486 15.6205 11.7586 15.4905 11.6486L14.0105 10.4886C14.0405 10.2686 14.0605 10.0386 14.0605 9.80859C14.0605 9.57859 14.0405 9.34859 14.0105 9.11859L15.4905 7.95859C15.6205 7.84859 15.6605 7.65859 15.5705 7.50859L14.1705 5.08859C14.0805 4.93859 13.9005 4.87859 13.7405 4.93859L12.0005 5.63859C11.6405 5.35859 11.2505 5.12859 10.8205 4.94859L10.5605 3.09859C10.5305 2.93859 10.3805 2.80859 10.2105 2.80859H7.41049C7.24049 2.80859 7.09049 2.93859 7.06049 3.10859L6.80049 4.95859C6.38049 5.13859 5.98049 5.36859 5.62049 5.64859L3.88049 4.94859C3.72049 4.88859 3.54049 4.94859 3.45049 5.09859L2.05049 7.51859C1.96049 7.66859 2.00049 7.85859 2.13049 7.96859L3.61049 9.12859C3.58049 9.34859 3.56049 9.57859 3.56049 9.80859C3.56049 10.0386 3.58049 10.2686 3.61049 10.4986L2.13049 11.6586C2.00049 11.7686 1.96049 11.9586 2.05049 12.1086L3.45049 14.5286C3.54049 14.6786 3.72049 14.7386 3.88049 14.6786L5.62049 13.9786C5.98049 14.2586 6.37049 14.4886 6.80049 14.6686L7.06049 16.5186C7.09049 16.6786 7.24049 16.8086 7.41049 16.8086H10.2105C10.3805 16.8086 10.5305 16.6786 10.5605 16.5086L10.8205 14.6586C11.2405 14.4786 11.6405 14.2486 12.0005 13.9686L13.7405 14.6686C13.9005 14.7286 14.0805 14.6686 14.1705 14.5186ZM8.81049 11.8086C7.71049 11.8086 6.81049 10.9086 6.81049 9.80859C6.81049 8.70859 7.71049 7.80859 8.81049 7.80859C9.91049 7.80859 10.8105 8.70859 10.8105 9.80859C10.8105 10.9086 9.91049 11.8086 8.81049 11.8086Z"
  />
  <path
    d="M21.9212 19.4786L20.9612 18.7386C20.9812 18.5986 21.0012 18.4486 21.0012 18.2986C21.0012 18.1486 20.9912 17.9986 20.9612 17.8586L21.9112 17.1186C21.9912 17.0486 22.0212 16.9286 21.9612 16.8286L21.0612 15.2786C21.0112 15.1786 20.8912 15.1486 20.7812 15.1786L19.6712 15.6286C19.4412 15.4486 19.1912 15.2986 18.9112 15.1886L18.7412 14.0086C18.7312 13.8886 18.6312 13.8086 18.5312 13.8086H16.7412C16.6312 13.8086 16.5312 13.8886 16.5212 13.9986L16.3512 15.1786C16.0812 15.2986 15.8212 15.4386 15.5912 15.6186L14.4812 15.1686C14.3812 15.1286 14.2612 15.1686 14.2012 15.2686L13.3012 16.8186C13.2512 16.9186 13.2612 17.0386 13.3512 17.1086L14.3012 17.8486C14.2812 17.9886 14.2712 18.1386 14.2712 18.2886C14.2712 18.4386 14.2812 18.5886 14.3012 18.7286L13.3512 19.4686C13.2712 19.5386 13.2412 19.6586 13.3012 19.7586L14.2012 21.3086C14.2512 21.4086 14.3712 21.4386 14.4812 21.4086L15.5912 20.9586C15.8212 21.1386 16.0712 21.2886 16.3512 21.3986L16.5212 22.5786C16.5412 22.6886 16.6312 22.7686 16.7412 22.7686H18.5312C18.6412 22.7686 18.7412 22.6886 18.7512 22.5786L18.9212 21.3986C19.1912 21.2786 19.4512 21.1386 19.6712 20.9586L20.7912 21.4086C20.8912 21.4486 21.0112 21.4086 21.0712 21.3086L21.9712 19.7586C22.0312 19.6686 22.0012 19.5486 21.9212 19.4786ZM17.6312 19.6386C16.8912 19.6386 16.2812 19.0386 16.2812 18.2886C16.2812 17.5386 16.8812 16.9386 17.6312 16.9386C18.3812 16.9386 18.9812 17.5386 18.9812 18.2886C18.9812 19.0386 18.3712 19.6386 17.6312 19.6386Z"
  />
</template>