<template>
  <path
    d="M21.1875 3.80859H2.8125C2.15625 3.80859 1.5 4.45145 1.5 5.09431V18.8086C1.5 19.5586 2.25 20.3086 3 20.3086H9V23.3086H15V20.3086H21C21.6562 20.3086 22.4916 19.4515 22.4916 18.8086C22.4916 18.8086 22.5 5.73717 22.5 5.09431C22.5 4.45145 21.8438 3.80859 21.1875 3.80859ZM19.5 17.3086H4.5V6.80859H19.5V17.3086ZM15.9375 10.88V13.4515H13.5V15.38H10.6875V13.4515H8.0625V10.88H10.6875V8.95145H13.3125V10.88H15.9375Z"
  />
</template>