<template>
  <path
    d="M12 2.80859C6.48 2.80859 2 7.28859 2 12.8086C2 18.3286 6.48 22.8086 12 22.8086C17.52 22.8086 22 18.3286 22 12.8086C22 7.28859 17.52 2.80859 12 2.80859ZM12 20.8086C7.58 20.8086 4 17.2286 4 12.8086C4 10.9586 4.63 9.25859 5.69 7.90859L16.9 19.1186C15.55 20.1786 13.85 20.8086 12 20.8086ZM18.31 17.7086L7.1 6.49859C8.45 5.43859 10.15 4.80859 12 4.80859C16.42 4.80859 20 8.38859 20 12.8086C20 14.6586 19.37 16.3586 18.31 17.7086Z"
  />
</template>