<template>
  <path
    d="M9 12.5586C8.31 12.5586 7.75 13.1186 7.75 13.8086C7.75 14.4986 8.31 15.0586 9 15.0586C9.69 15.0586 10.25 14.4986 10.25 13.8086C10.25 13.1186 9.69 12.5586 9 12.5586ZM15 12.5586C14.31 12.5586 13.75 13.1186 13.75 13.8086C13.75 14.4986 14.31 15.0586 15 15.0586C15.69 15.0586 16.25 14.4986 16.25 13.8086C16.25 13.1186 15.69 12.5586 15 12.5586ZM12 2.80859C6.48 2.80859 2 7.28859 2 12.8086C2 18.3286 6.48 22.8086 12 22.8086C17.52 22.8086 22 18.3286 22 12.8086C22 7.28859 17.52 2.80859 12 2.80859ZM12 20.8086C7.59 20.8086 4 17.2186 4 12.8086C4 12.5186 4.02 12.2286 4.05 11.9486C6.41 10.8986 8.28 8.96859 9.26 6.57859C11.07 9.13859 14.05 10.8086 17.42 10.8086C18.2 10.8086 18.95 10.7186 19.67 10.5486C19.88 11.2586 20 12.0186 20 12.8086C20 17.2186 16.41 20.8086 12 20.8086Z"
  />
</template>