<template>
  <path
    d="M3 18.0587V21.8087H6.75L17.81 10.7487L14.06 6.99865L3 18.0587ZM20.71 7.84865C21.1 7.45865 21.1 6.82865 20.71 6.43865L18.37 4.09865C17.98 3.70865 17.35 3.70865 16.96 4.09865L15.13 5.92865L18.88 9.67865L20.71 7.84865Z"
  />
</template>