<template>
  <path
    d="M20.01 16.1886C18.78 16.1886 17.59 15.9886 16.48 15.6286C16.13 15.5086 15.74 15.5986 15.47 15.8686L13.9 17.8386C11.07 16.4886 8.42 13.9386 7.01 11.0086L8.96 9.34859C9.23 9.06859 9.31 8.67859 9.2 8.32859C8.83 7.21859 8.64 6.02859 8.64 4.79859C8.64 4.25859 8.19 3.80859 7.65 3.80859H4.19C3.65 3.80859 3 4.04859 3 4.79859C3 14.0886 10.73 21.8086 20.01 21.8086C20.72 21.8086 21 21.1786 21 20.6286V17.1786C21 16.6386 20.55 16.1886 20.01 16.1886Z"
  />
</template>