<template>
  <path
    d="M20 16.3086C18.75 16.3086 17.55 16.1086 16.43 15.7386C16.08 15.6286 15.69 15.7086 15.41 15.9786L13.21 18.1786C10.38 16.7386 8.06 14.4286 6.62 11.5886L8.82 9.37859C9.1 9.11859 9.18 8.72859 9.07 8.37859C8.7 7.25859 8.5 6.05859 8.5 4.80859C8.5 4.25859 8.05 3.80859 7.5 3.80859H4C3.45 3.80859 3 4.25859 3 4.80859C3 14.1986 10.61 21.8086 20 21.8086C20.55 21.8086 21 21.3586 21 20.8086V17.3086C21 16.7586 20.55 16.3086 20 16.3086ZM21 6.80859H18V3.80859H16V6.80859H13V8.80859H16V11.8086H18V8.80859H21V6.80859Z"
  />
</template>