<template>
  <path
    d="M10.2988 0.795017L6 4.58752L1.7025 0.795017C1.3125 0.405017 0.6825 0.405017 0.2925 0.795017C-0.0975 1.18502 -0.0975 1.81502 0.2925 2.20502L5.3 6.70752C5.69 7.09752 6.32 7.09752 6.71 6.70752L11.7188 2.20502C12.1088 1.81502 12.1088 1.18502 11.7188 0.795017C11.3287 0.415017 10.6888 0.405017 10.2988 0.795017Z"
  />
</template>