<template>
  <LvSkeleton v-bind="$attrs">
    <rect x="0" y="0" rx="3" ry="3" width="250" height="10" />
    <rect x="20" y="20" rx="3" ry="3" width="220" height="10" />
    <rect x="20" y="40" rx="3" ry="3" width="170" height="10" />
    <rect x="0" y="60" rx="3" ry="3" width="250" height="10" />
    <rect x="20" y="80" rx="3" ry="3" width="200" height="10" />
    <rect x="20" y="100" rx="3" ry="3" width="80" height="10" />
  </LvSkeleton>
</template>

<script>
import LvSkeleton from 'lightvue/skeleton';
export default {
  components: {
    LvSkeleton,
  },
};
</script>
