<template>
  <path
    d="M8.88 9.94024L9.41 10.4702C9.7 10.7602 10.18 10.7602 10.47 10.4702C10.76 10.1802 10.76 9.70024 10.47 9.41024L9.59 8.53024C9.2 8.14024 8.57 8.14024 8.18 8.53024L7.29 9.41024C7 9.70024 7 10.1802 7.29 10.4702C7.58 10.7602 8.06 10.7602 8.35 10.4702L8.88 9.94024ZM12 17.5002C14.03 17.5002 15.8 16.3902 16.75 14.7502C16.94 14.4202 16.7 14.0002 16.31 14.0002H7.69C7.31 14.0002 7.06 14.4202 7.25 14.7502C8.2 16.3902 9.97 17.5002 12 17.5002ZM13.53 10.4702C13.82 10.7602 14.3 10.7602 14.59 10.4702L15.12 9.94024L15.65 10.4702C15.94 10.7602 16.42 10.7602 16.71 10.4702C17 10.1802 17 9.70024 16.71 9.41024L15.83 8.53024C15.44 8.14024 14.81 8.14024 14.42 8.53024L13.54 9.41024C13.24 9.70024 13.24 10.1802 13.53 10.4702ZM11.99 2.00024C6.47 2.00024 2 6.47024 2 12.0002C2 17.5302 6.47 22.0002 11.99 22.0002C17.51 22.0002 22 17.5302 22 12.0002C22 6.47024 17.52 2.00024 11.99 2.00024ZM12 20.0002C7.58 20.0002 4 16.4202 4 12.0002C4 7.58024 7.58 4.00024 12 4.00024C16.42 4.00024 20 7.58024 20 12.0002C20 16.4202 16.42 20.0002 12 20.0002Z"
  />
</template>
