<template>
  <path
    d="M12 13.5002C9.97 13.5002 8.2 14.6102 7.25 16.2502C7.06 16.5802 7.31 17.0002 7.69 17.0002H16.31C16.69 17.0002 16.94 16.5802 16.75 16.2502C15.8 14.6102 14.03 13.5002 12 13.5002ZM8.35 11.4702L8.88 10.9402L9.41 11.4702C9.7 11.7602 10.18 11.7602 10.47 11.4702C10.76 11.1802 10.76 10.7002 10.47 10.4102L9.94 9.88024L10.47 9.35024C10.76 9.06024 10.76 8.58024 10.47 8.29024C10.18 8.00024 9.7 8.00024 9.41 8.29024L8.88 8.82024L8.35 8.29024C8.06 8.00024 7.58 8.00024 7.29 8.29024C7 8.58024 7 9.06024 7.29 9.35024L7.82 9.88024L7.29 10.4102C7 10.7002 7 11.1802 7.29 11.4702C7.58 11.7602 8.06 11.7602 8.35 11.4702ZM11.99 2.00024C6.47 2.00024 2 6.47024 2 12.0002C2 17.5302 6.47 22.0002 11.99 22.0002C17.51 22.0002 22 17.5302 22 12.0002C22 6.47024 17.52 2.00024 11.99 2.00024ZM12 20.0002C7.58 20.0002 4 16.4202 4 12.0002C4 7.58024 7.58 4.00024 12 4.00024C16.42 4.00024 20 7.58024 20 12.0002C20 16.4202 16.42 20.0002 12 20.0002ZM15.65 8.29024L15.12 8.82024L14.59 8.29024C14.3 8.00024 13.82 8.00024 13.53 8.29024C13.24 8.58024 13.24 9.06024 13.53 9.35024L14.06 9.88024L13.53 10.4102C13.24 10.7002 13.24 11.1802 13.53 11.4702C13.82 11.7602 14.3 11.7602 14.59 11.4702L15.12 10.9402L15.65 11.4702C15.94 11.7602 16.42 11.7602 16.71 11.4702C17 11.1802 17 10.7002 16.71 10.4102L16.18 9.88024L16.71 9.35024C17 9.06024 17 8.58024 16.71 8.29024C16.42 8.00024 15.94 8.00024 15.65 8.29024Z"
  />
</template>
