<template>
  <g>
    <path
      d="M12 8.00024C13.1046 8.00024 14 7.10481 14 6.00024C14 4.89567 13.1046 4.00024 12 4.00024C10.8954 4.00024 10 4.89567 10 6.00024C10 7.10481 10.8954 8.00024 12 8.00024Z"
    />
    <path
      d="M21 14.9402C21 14.4402 20.64 14.0102 20.15 13.9602C18.27 13.7502 16.66 12.8302 15.4 11.3302L14.06 9.73024C13.68 9.26024 13.12 9.00024 12.53 9.00024H11.48C10.89 9.00024 10.33 9.26024 9.95 9.72024L8.61 11.3202C7.36 12.8202 5.74 13.7402 3.86 13.9502C3.36 14.0102 3 14.4402 3 14.9402C3 15.5402 3.53 16.0102 4.13 15.9402C6.43 15.6702 8.45 14.5502 10 12.7502V15.0002L6.24 16.5002C5.59 16.7602 5.08 17.3302 5.01 18.0302C4.91 19.1002 5.74 20.0002 6.79 20.0002H9V19.5002C9 18.1202 10.12 17.0002 11.5 17.0002H14.5C14.78 17.0002 15 17.2202 15 17.5002C15 17.7802 14.78 18.0002 14.5 18.0002H11.5C10.67 18.0002 10 18.6702 10 19.5002V20.0002H17.1C17.95 20.0002 18.75 19.4602 18.95 18.6302C19.16 17.7402 18.68 16.8702 17.87 16.5502L14 15.0002V12.7502C15.56 14.5502 17.57 15.6602 19.87 15.9402C20.47 16.0002 21 15.5402 21 14.9402Z"
    />
  </g>
</template>
