<template>
  <path
    d="M5 13.1802V15.9902C5 16.7202 5.4 17.4002 6.04 17.7502L11.04 20.4802C11.64 20.8102 12.36 20.8102 12.96 20.4802L17.96 17.7502C18.6 17.4002 19 16.7202 19 15.9902V13.1802L12.96 16.4802C12.36 16.8102 11.64 16.8102 11.04 16.4802L5 13.1802ZM11.04 3.52024L2.61 8.12024C1.92 8.50024 1.92 9.50024 2.61 9.88024L11.04 14.4802C11.64 14.8102 12.36 14.8102 12.96 14.4802L21 10.0902V16.0002C21 16.5502 21.45 17.0002 22 17.0002C22.55 17.0002 23 16.5502 23 16.0002V9.59024C23 9.22024 22.8 8.89024 22.48 8.71024L12.96 3.52024C12.36 3.20024 11.64 3.20024 11.04 3.52024Z"
  />
</template>
