<template>
  <path
    d="M19.93 8.35024L16.33 10.0302L14 7.70024V6.30024L16.33 3.97024L19.93 5.65024C20.31 5.83024 20.75 5.66024 20.93 5.29024C21.11 4.91024 20.94 4.47024 20.57 4.29024L16.65 2.46024C16.27 2.28024 15.82 2.36024 15.52 2.66024L13.78 4.40024C13.6 4.16024 13.32 4.00024 13 4.00024C12.45 4.00024 12 4.45024 12 5.00024V6.00024H8.82C8.34 4.66024 6.96 3.75024 5.4 4.06024C4.23 4.29024 3.27 5.25024 3.05 6.42024C2.8 7.76024 3.45 8.96024 4.48 9.58024L7.08 18.0002H5.5C4.67 18.0002 4 18.6702 4 19.5002C4 20.3302 4.67 21.0002 5.5 21.0002H15.5C16.33 21.0002 17 20.3302 17 19.5002C17 18.6702 16.33 18.0002 15.5 18.0002H13.38L8.41 8.77024C8.58 8.53024 8.72 8.28024 8.82 8.00024H12V9.00024C12 9.55024 12.45 10.0002 13 10.0002C13.32 10.0002 13.6 9.84024 13.78 9.60024L15.52 11.3402C15.82 11.6402 16.27 11.7202 16.65 11.5402L20.57 9.71024C20.95 9.53024 21.11 9.09024 20.93 8.71024C20.75 8.34024 20.31 8.17024 19.93 8.35024ZM6 8.00024C5.45 8.00024 5 7.55024 5 7.00024C5 6.45024 5.45 6.00024 6 6.00024C6.55 6.00024 7 6.45024 7 7.00024C7 7.55024 6.55 8.00024 6 8.00024Z"
  />
</template>
