<template>
  <path
    d="M18 16.0002V11.0002C18 7.93024 16.36 5.36024 13.5 4.68024V4.00024C13.5 3.17024 12.82 2.50024 11.99 2.50024C11.16 2.50024 10.5 3.17024 10.5 4.00024V4.68024C7.63001 5.36024 6.00001 7.92024 6.00001 11.0002V16.0002L4.70001 17.2902C4.07001 17.9202 4.51001 19.0002 5.40001 19.0002H18.57C19.46 19.0002 19.91 17.9202 19.28 17.2902L18 16.0002ZM11.99 22.0002C13.09 22.0002 13.99 21.1002 13.99 20.0002H9.99001C9.99001 21.1002 10.88 22.0002 11.99 22.0002ZM6.77001 4.73024C7.19001 4.35024 7.20001 3.70024 6.80001 3.30024C6.42001 2.92024 5.80001 2.91024 5.41001 3.28024C3.70001 4.84024 2.52001 6.96024 2.14001 9.34024C2.05001 9.95024 2.52001 10.5002 3.14001 10.5002C3.62001 10.5002 4.04001 10.1502 4.12001 9.67024C4.42001 7.73024 5.38001 6.00024 6.77001 4.73024ZM18.6 3.28024C18.2 2.91024 17.58 2.92024 17.2 3.30024C16.8 3.70024 16.82 4.34024 17.23 4.72024C18.61 5.99024 19.58 7.72024 19.88 9.66024C19.95 10.1402 20.37 10.4902 20.86 10.4902C21.47 10.4902 21.95 9.94024 21.85 9.33024C21.47 6.96024 20.3 4.85024 18.6 3.28024Z"
  />
</template>
