<template>
  <path
    d="M17 10.4302V3.00024C17 2.45024 16.55 2.00024 16 2.00024H8C7.45 2.00024 7 2.45024 7 3.00024V10.4302C7 10.7802 7.18 11.1102 7.49 11.2902L11.67 13.8002L10.68 16.1402L8.46 16.3302C8 16.3702 7.82 16.9202 8.16 17.2102L9.85 18.6702L9.34 20.8502C9.24 21.2802 9.71 21.6202 10.09 21.3902L12 20.2302L13.91 21.3802C14.29 21.6102 14.76 21.2702 14.66 20.8402L14.15 18.6602L15.84 17.2002C16.17 16.9102 16 16.3602 15.55 16.3202L13.33 16.1302L12.34 13.7902L16.52 11.2802C16.82 11.1102 17 10.7902 17 10.4302ZM13 12.2302L12 12.8302L11 12.2302V3.00024H13V12.2302Z"
  />
</template>
