<template>
  <path
    d="M19.5 6.00024C18.19 6.00024 17.13 7.01024 17.02 8.30024C15.14 7.80024 14.18 6.50024 12 6.50024C9.81 6.50024 8.86 7.80024 6.98 8.30024C6.87 7.02024 5.81 6.00024 4.5 6.00024C3.12 6.00024 2 7.12024 2 8.50024V9.00024C2 15.0002 5.6 16.8102 8.52 16.9802C9.53 17.6202 10.72 18.0002 12 18.0002C13.28 18.0002 14.47 17.6202 15.48 16.9802C18.4 16.8102 22 15.0002 22 9.00024V8.50024C22 7.12024 20.88 6.00024 19.5 6.00024ZM3.5 9.00024V8.50024C3.5 7.95024 3.95 7.50024 4.5 7.50024C5.05 7.50024 5.5 7.95024 5.5 8.50024V11.5002C5.5 12.7802 5.88 13.9702 6.51 14.9802C4.99 14.2702 3.5 12.6502 3.5 9.00024ZM14.3 11.0102C13.9 10.8402 13.58 10.6502 13.29 10.4802C12.83 10.2002 12.49 10.0002 12 10.0002C11.51 10.0002 11.16 10.2002 10.69 10.4802C10.41 10.6502 10.09 10.8302 9.71 10.9902C9.37 11.1402 9 10.9102 9 10.5402C9 10.3402 9.11 10.1602 9.29 10.0902C9.63 9.95024 9.91 9.78024 10.17 9.63024C10.72 9.30024 11.23 9.00024 12 9.00024C12.77 9.00024 13.27 9.30024 13.8 9.62024C14.07 9.78024 14.35 9.95024 14.7 10.1002C14.88 10.1802 14.99 10.3602 14.99 10.5502C15 10.9102 14.63 11.1502 14.3 11.0102ZM20.5 9.00024C20.5 12.6502 19.01 14.2702 17.49 14.9802C18.13 13.9702 18.5 12.7802 18.5 11.5002V8.50024C18.5 7.95024 18.95 7.50024 19.5 7.50024C20.05 7.50024 20.5 7.95024 20.5 8.50024V9.00024Z"
  />
</template>
