<template>
  <path
    d="M9.5 5.50024C10.6 5.50024 11.5 4.60024 11.5 3.50024C11.5 2.40024 10.6 1.50024 9.5 1.50024C8.4 1.50024 7.5 2.40024 7.5 3.50024C7.5 4.60024 8.4 5.50024 9.5 5.50024ZM5.75 8.90024L3.23 21.8102C3.11 22.4302 3.58 23.0002 4.21 23.0002H4.3C4.77 23.0002 5.18 22.6702 5.28 22.2102L6.85 15.0002L9 17.0002V22.0002C9 22.5502 9.45 23.0002 10 23.0002C10.55 23.0002 11 22.5502 11 22.0002V15.8602C11 15.5902 10.89 15.3402 10.71 15.1502L8.95 13.4002L9.55 10.4002C10.62 11.7202 12.13 12.6302 13.86 12.9102C14.46 13.0102 15 12.5202 15 11.9102C15 11.4202 14.64 11.0102 14.16 10.9302C12.67 10.6802 11.41 9.78024 10.65 8.55024L9.7 6.95024C9.35 6.35024 8.7 6.00024 8 6.00024C7.75 6.00024 7.5 6.05024 7.25 6.15024L2.62 8.05024C2.25 8.20024 2 8.57024 2 8.97024V12.0002C2 12.5502 2.45 13.0002 3 13.0002C3.55 13.0002 4 12.5502 4 12.0002V9.65024L5.75 8.90024ZM21 2.00024H14C13.45 2.00024 13 2.45024 13 3.00024V8.00024C13 8.55024 13.45 9.00024 14 9.00024H16.75V22.2502C16.75 22.6602 17.09 23.0002 17.5 23.0002C17.91 23.0002 18.25 22.6602 18.25 22.2502V9.00024H21C21.55 9.00024 22 8.55024 22 8.00024V3.00024C22 2.45024 21.55 2.00024 21 2.00024ZM20.15 5.85024L18.87 7.14024C18.56 7.46024 18.02 7.23024 18.02 6.79024V6.25024H15.26C14.85 6.25024 14.51 5.91024 14.51 5.50024C14.51 5.09024 14.85 4.75024 15.26 4.75024H18.02V4.21024C18.02 3.76024 18.56 3.54024 18.87 3.86024L20.15 5.15024C20.34 5.34024 20.34 5.66024 20.15 5.85024Z"
  />
</template>
