<template>
  <g>
    <path
      d="M9 15.0002C6.33 15.0002 1 16.3402 1 19.0002V20.0002C1 20.5502 1.45 21.0002 2 21.0002H16C16.55 21.0002 17 20.5502 17 20.0002V19.0002C17 16.3402 11.67 15.0002 9 15.0002Z"
    />
    <path
      d="M4.74 9.00024H13.27C13.54 9.00024 13.76 8.78024 13.76 8.51024V8.49024C13.76 8.22024 13.54 8.00024 13.27 8.00024H13C13 6.52024 12.19 5.25024 11 4.55024V5.50024C11 5.78024 10.78 6.00024 10.5 6.00024C10.22 6.00024 10 5.78024 10 5.50024V4.14024C9.68 4.06024 9.35 4.00024 9 4.00024C8.65 4.00024 8.32 4.06024 8 4.14024V5.50024C8 5.78024 7.78 6.00024 7.5 6.00024C7.22 6.00024 7 5.78024 7 5.50024V4.55024C5.81 5.25024 5 6.52024 5 8.00024H4.74C4.47 8.00024 4.25 8.22024 4.25 8.49024V8.52024C4.25 8.78024 4.47 9.00024 4.74 9.00024Z"
    />
    <path
      d="M9.00001 13.0002C10.86 13.0002 12.41 11.7202 12.86 10.0002H5.14001C5.59001 11.7202 7.14001 13.0002 9.00001 13.0002Z"
    />
    <path
      d="M21.98 6.23024L22.91 5.40024L22.16 4.10024L20.97 4.49024C20.83 4.38024 20.67 4.29024 20.5 4.22024L20.25 3.00024H18.75L18.5 4.22024C18.33 4.29024 18.17 4.38024 18.02 4.49024L16.84 4.10024L16.09 5.40024L17.02 6.23024C17 6.40024 17 6.58024 17.02 6.75024L16.09 7.60024L16.84 8.90024L18.04 8.52024C18.17 8.62024 18.32 8.70024 18.47 8.77024L18.75 10.0002H20.25L20.52 8.78024C20.68 8.71024 20.82 8.63024 20.96 8.53024L22.15 8.91024L22.9 7.61024L21.97 6.76024C22 6.57024 21.99 6.40024 21.98 6.23024ZM19.5 7.75024C18.81 7.75024 18.25 7.19024 18.25 6.50024C18.25 5.81024 18.81 5.25024 19.5 5.25024C20.19 5.25024 20.75 5.81024 20.75 6.50024C20.75 7.19024 20.19 7.75024 19.5 7.75024Z"
    />
    <path
      d="M19.4 10.7902L18.55 11.0702C18.45 10.9902 18.34 10.9302 18.22 10.8802L18.04 10.0002H16.97L16.79 10.8702C16.67 10.9202 16.55 10.9902 16.45 11.0602L15.61 10.7802L15.07 11.7102L15.73 12.3002C15.72 12.4302 15.72 12.5502 15.73 12.6702L15.07 13.2802L15.61 14.2102L16.47 13.9402C16.57 14.0102 16.67 14.0702 16.78 14.1202L16.96 15.0002H18.03L18.22 14.1302C18.33 14.0802 18.44 14.0202 18.54 13.9502L19.39 14.2202L19.93 13.2902L19.27 12.6802C19.28 12.5502 19.28 12.4302 19.27 12.3102L19.93 11.7202L19.4 10.7902ZM17.5 13.3902C17.01 13.3902 16.61 12.9902 16.61 12.5002C16.61 12.0102 17.01 11.6102 17.5 11.6102C17.99 11.6102 18.39 12.0102 18.39 12.5002C18.39 12.9902 17.99 13.3902 17.5 13.3902Z"
    />
  </g>
</template>
