<template>
  <g>
    <path
      d="M20.99 17.9902L16.05 13.0502L13.93 15.1702L18.87 20.1102C19.46 20.7002 20.41 20.7002 20.99 20.1102C21.57 19.5202 21.57 18.5702 20.99 17.9902Z"
    />
    <path
      d="M17.65 10.0002C19.58 10.0002 21.15 8.43023 21.15 6.50023C21.15 5.92023 20.99 5.38023 20.74 4.90023L18.04 7.60023L16.55 6.11023L19.25 3.41023C18.77 3.16023 18.23 3.00023 17.65 3.00023C15.72 3.00023 14.15 4.57023 14.15 6.50023C14.15 6.91023 14.23 7.30023 14.36 7.66023L12.51 9.51023L10.73 7.73023C11.12 7.34023 11.12 6.71023 10.73 6.32023L10.02 5.61023L12.14 3.49023C10.97 2.32023 9.07001 2.32023 7.90001 3.49023L5.08001 6.32023C4.69001 6.71023 4.69001 7.34023 5.08001 7.73023L5.79001 8.44023H3.25001C3.06001 8.44023 2.88001 8.51023 2.75001 8.65023C2.47001 8.93023 2.47001 9.37023 2.75001 9.65023L5.29001 12.1902C5.57001 12.4702 6.01001 12.4702 6.29001 12.1902C6.42001 12.0602 6.50001 11.8802 6.50001 11.6902V9.15023L7.20001 9.85023C7.59001 10.2402 8.22001 10.2402 8.61001 9.85023L10.39 11.6302L4.04001 17.9802C3.45001 18.5702 3.45001 19.5202 4.04001 20.1002C4.63001 20.6902 5.58001 20.6902 6.16001 20.1002L16.48 9.79023C16.85 9.92023 17.24 10.0002 17.65 10.0002Z"
    />
  </g>
</template>
