<template>
  <path
    d="M14.99 7.00024L16.36 6.37024L16.99 5.00024L17.62 6.37024L18.99 7.00024L17.62 7.63024L16.99 9.00024L16.36 7.63024L14.99 7.00024ZM20 14.0002C21.1 14.0002 22 13.1002 22 12.0002C22 11.2202 21.01 9.56024 20.42 8.64024C20.22 8.33024 19.78 8.33024 19.58 8.64024C18.99 9.56024 18 11.2202 18 12.0002C18 13.1002 18.9 14.0002 20 14.0002ZM9.24 9.50024L15 11.6502V11.0002C15 8.58024 13.28 6.56024 11 6.10024V4.00024H13C13.35 4.00024 13.68 4.06024 14 4.18024C14.37 4.31024 14.78 4.23024 15.05 3.96024C15.56 3.45024 15.39 2.57024 14.72 2.32024C14.19 2.11024 13.61 2.00024 13 2.00024H8.5C7.95 2.00024 7.5 2.45024 7.5 3.00024C7.5 3.55024 7.95 4.00024 8.5 4.00024H9V6.11024C7.22 6.48024 5.8 7.79024 5.25 9.50024H9.24ZM3 11.0002C1.9 11.0002 1 11.9002 1 13.0002V20.0002C1 21.1002 1.9 22.0002 3 22.0002C4.1 22.0002 5 21.1002 5 20.0002V13.0002C5 11.9002 4.1 11.0002 3 11.0002ZM19.99 17.0002H13.16C13.05 17.0002 12.94 16.9802 12.83 16.9402L11.36 16.4302C11.1 16.3402 10.97 16.0602 11.06 15.8002C11.15 15.5402 11.44 15.4002 11.7 15.5002L12.82 15.9302C12.93 15.9702 13.06 16.0002 13.18 16.0002H15.81C16.46 16.0002 16.99 15.4702 16.99 14.8202C16.99 14.3302 16.68 13.8902 16.22 13.7102L9.3 11.1302C9.08 11.0402 8.84 11.0002 8.6 11.0002H7V20.0202L13.37 21.8302C13.78 21.9502 14.22 21.9302 14.62 21.7802L22 19.0002C22 17.8902 21.1 17.0002 19.99 17.0002Z"
  />
</template>
