<template>
  <path
    d="M1.94 11.7902C1.34 12.3502 1 13.1402 1 13.9702V20.0002C1 21.6602 2.34 23.0002 4 23.0002H17.68C18.33 23.0002 18.93 22.5302 19 21.8802C19.08 21.1302 18.49 20.5002 17.76 20.5002H12.5C12.22 20.5002 12 20.2802 12 20.0002C12 19.7202 12.22 19.5002 12.5 19.5002H19.68C20.33 19.5002 20.93 19.0302 21 18.3802C21.08 17.6302 20.49 17.0002 19.76 17.0002H12.5C12.22 17.0002 12 16.7802 12 16.5002C12 16.2202 12.22 16.0002 12.5 16.0002H20.68C21.33 16.0002 21.93 15.5302 22 14.8802C22.08 14.1302 21.49 13.5002 20.76 13.5002H12.5C12.22 13.5002 12 13.2802 12 13.0002C12 12.7202 12.22 12.5002 12.5 12.5002H18.68C19.33 12.5002 19.93 12.0302 20 11.3802C20.08 10.6302 19.49 10.0002 18.76 10.0002H8.86L10.35 7.3902C10.44 7.23021 10.49 7.0602 10.49 6.86021C10.49 6.60021 10.4 6.3602 10.23 6.1602L9.81 5.71021C9.43 5.32021 8.8 5.3002 8.4 5.6802L1.94 11.7902ZM18.5 8.00021C19.88 8.00021 21 6.88021 21 5.50021C21 4.25021 19.59 2.34021 18.89 1.46021C18.69 1.21021 18.32 1.21021 18.12 1.46021C17.41 2.34021 16 4.25021 16 5.50021C16 6.88021 17.12 8.00021 18.5 8.00021ZM13.5 9.00021C14.33 9.00021 15 8.3302 15 7.50021C15 6.94021 14.33 6.01021 13.89 5.46021C13.69 5.21021 13.31 5.21021 13.12 5.46021C12.67 6.01021 12 6.94021 12 7.50021C12 8.3302 12.67 9.00021 13.5 9.00021Z"
  />
</template>
