<template>
  <path
    d="M18 20.0002C18 21.1002 17.1 22.0002 16 22.0002C14.9 22.0002 14 21.1002 14 20.0002C14 18.9002 14.9 18.0002 16 18.0002C17.1 18.0002 18 18.9002 18 20.0002ZM6 18.0002C4.9 18.0002 4 18.9002 4 20.0002C4 21.1002 4.9 22.0002 6 22.0002C7.1 22.0002 8 21.1002 8 20.0002C8 18.9002 7.1 18.0002 6 18.0002ZM14.3 4.10024C13.03 3.40024 11.56 3.00024 10 3.00024C8.49 3.00024 7.07 3.38024 5.83 4.03024C5.24 4.34024 5.15 5.15024 5.61 5.61024L9.6 9.60024L14.3 4.10024ZM21.94 5.83024C21.65 4.22024 20.3 3.00024 18.65 3.00024C16.99 3.00024 16.11 4.27024 15.47 5.03024L6.71 15.3102C6.16 15.9602 6.62 16.9602 7.47 16.9602H15C16.1 16.9602 17 16.0602 17 14.9602V6.27024C17.58 5.59024 17.97 5.00024 18.65 5.00024C19.33 5.00024 19.87 5.52024 19.98 6.21024C20.08 6.66024 20.48 7.00024 20.96 7.00024C21.51 7.00024 21.96 6.55024 21.96 6.00024C21.96 5.94024 21.95 5.89024 21.94 5.83024Z"
  />
</template>
