<template>
  <path
    d="M21.9 8.89024L20.85 4.52024C20.63 3.62024 19.85 3.00024 18.94 3.00024H16.73H14.72H13H11H9.28001H7.26001H5.05001C4.15001 3.00024 3.36001 3.63024 3.15001 4.52024L2.10001 8.89024C1.86001 9.91024 2.08001 10.9502 2.72001 11.7702C2.80001 11.8802 2.91001 11.9602 3.00001 12.0602V19.0002C3.00001 20.1002 3.90001 21.0002 5.00001 21.0002H19C20.1 21.0002 21 20.1002 21 19.0002V12.0602C21.09 11.9702 21.2 11.8802 21.28 11.7802C21.92 10.9602 22.15 9.91024 21.9 8.89024ZM7.02001 5.00024L6.44001 9.86024C6.36001 10.5102 5.84001 11.0002 5.23001 11.0002C4.74001 11.0002 4.43001 10.7102 4.30001 10.5302C4.04001 10.2002 3.95001 9.77024 4.05001 9.36024L5.05001 5.00024H7.02001ZM18.91 4.99024L19.96 9.36024C20.06 9.78024 19.97 10.2002 19.71 10.5302C19.57 10.7102 19.27 11.0002 18.77 11.0002C18.16 11.0002 17.63 10.5102 17.56 9.86024L16.98 5.00024L18.91 4.99024ZM15.51 9.52024C15.56 9.91024 15.44 10.3002 15.18 10.5902C14.95 10.8502 14.63 11.0002 14.22 11.0002C13.55 11.0002 13 10.4102 13 9.69024V5.00024H14.96L15.51 9.52024ZM11 9.69024C11 10.4102 10.45 11.0002 9.71001 11.0002C9.37001 11.0002 9.06001 10.8502 8.82001 10.5902C8.57001 10.3002 8.45001 9.91024 8.49001 9.52024L9.04001 5.00024H11V9.69024ZM18 19.0002H6.00001C5.45001 19.0002 5.00001 18.5502 5.00001 18.0002V12.9702C5.08001 12.9802 5.15001 13.0002 5.23001 13.0002C6.10001 13.0002 6.89001 12.6402 7.47001 12.0502C8.07001 12.6502 8.87001 13.0002 9.78001 13.0002C10.65 13.0002 11.43 12.6402 12.01 12.0702C12.6 12.6402 13.4 13.0002 14.3 13.0002C15.14 13.0002 15.94 12.6502 16.54 12.0502C17.12 12.6402 17.91 13.0002 18.78 13.0002C18.86 13.0002 18.93 12.9802 19.01 12.9702V18.0002C19 18.5502 18.55 19.0002 18 19.0002Z"
  />
</template>
