<template>
  <path
    d="M14.25 6.00024C14.66 6.00024 15 6.34024 15 6.75024C15 7.16024 14.66 7.50024 14.25 7.50024C13.84 7.50024 13.5 7.16024 13.5 6.75024C13.5 6.34024 13.84 6.00024 14.25 6.00024ZM14.25 4.50024C13.01 4.50024 12 5.51024 12 6.75024C12 7.99024 13.01 9.00024 14.25 9.00024C15.49 9.00024 16.5 7.99024 16.5 6.75024C16.5 5.51024 15.49 4.50024 14.25 4.50024ZM20 5.50024C20.28 5.50024 20.5 5.72024 20.5 6.00024C20.5 6.28024 20.28 6.50024 20 6.50024C19.72 6.50024 19.5 6.28024 19.5 6.00024C19.5 5.72024 19.72 5.50024 20 5.50024ZM20 4.00024C18.9 4.00024 18 4.90024 18 6.00024C18 7.10024 18.9 8.00024 20 8.00024C21.1 8.00024 22 7.10024 22 6.00024C22 4.90024 21.1 4.00024 20 4.00024ZM18 2.50024C18 3.33024 17.33 4.00024 16.5 4.00024C15.67 4.00024 15 3.33024 15 2.50024C15 1.67024 15.67 1.00024 16.5 1.00024C17.33 1.00024 18 1.67024 18 2.50024ZM1.94 11.7902C1.34 12.3502 1 13.1402 1 13.9702V20.0002C1 21.6602 2.34 23.0002 4 23.0002H17.68C18.33 23.0002 18.93 22.5302 19 21.8802C19.08 21.1302 18.49 20.5002 17.76 20.5002H12.5C12.22 20.5002 12 20.2802 12 20.0002C12 19.7202 12.22 19.5002 12.5 19.5002H19.68C20.33 19.5002 20.93 19.0302 21 18.3802C21.08 17.6302 20.49 17.0002 19.76 17.0002H12.5C12.22 17.0002 12 16.7802 12 16.5002C12 16.2202 12.22 16.0002 12.5 16.0002H20.68C21.33 16.0002 21.93 15.5302 22 14.8802C22.08 14.1302 21.49 13.5002 20.76 13.5002H12.5C12.22 13.5002 12 13.2802 12 13.0002C12 12.7202 12.22 12.5002 12.5 12.5002H18.68C19.33 12.5002 19.93 12.0302 20 11.3802C20.08 10.6302 19.49 10.0002 18.76 10.0002H8.86L10.35 7.39024C10.44 7.23024 10.49 7.06024 10.49 6.86024C10.49 6.60024 10.4 6.36024 10.23 6.16024L9.81 5.71024C9.43 5.32024 8.8 5.30024 8.4 5.68024L1.94 11.7902Z"
  />
</template>
