<template>
  <path
    d="M20.5 13.0002H22V16.0002H20.5V13.0002ZM18 13.0002H19.5V16.0002H18V13.0002ZM17 14.5002C17 13.6702 16.33 13.0002 15.5 13.0002H14.66L16.84 15.1802C16.94 14.9702 17 14.7402 17 14.5002ZM18.96 2.35021H19H18.96ZM18.85 4.73021C19.23 4.35021 19.52 3.89021 19.69 3.38021C19.85 2.88021 19.5 2.37021 18.98 2.36021C18.64 2.37021 18.37 2.61021 18.26 2.94021C18.08 3.49021 17.64 3.93021 17.09 4.11021C16.75 4.22021 16.5 4.50021 16.5 4.85021V5.00021C16.5 5.37021 16.77 5.69021 17.14 5.75021C19.07 6.06021 20.5 7.75021 20.5 9.77021V11.2502C20.5 11.6602 20.84 12.0002 21.25 12.0002C21.66 12.0002 22 11.6602 22 11.2502V9.76021C22 7.54021 20.72 5.62021 18.85 4.73021ZM14.61 8.65021H16.03C17.08 8.65021 18 9.39021 18 10.7002V11.2502C18 11.6602 18.33 12.0002 18.75 12.0002H18.76C19.17 12.0002 19.51 11.6702 19.51 11.2502V10.3602C19.51 8.55021 17.91 7.20021 16.04 7.20021H14.74C13.72 7.20021 12.8 6.47021 12.67 5.45021C12.55 4.50021 13.13 3.75021 13.97 3.52021C14.29 3.43021 14.51 3.14021 14.51 2.80021C14.51 2.31021 14.05 1.94021 13.58 2.08021C12.16 2.49021 11.13 3.81021 11.16 5.36021C11.18 7.21021 12.77 8.65021 14.61 8.65021ZM4.12 5.29021C3.73 4.90021 3.1 4.90021 2.71 5.29021C2.32 5.68021 2.32 6.31021 2.71 6.70021L9 13.0002H3.5C2.67 13.0002 2 13.6702 2 14.5002C2 15.3302 2.67 16.0002 3.5 16.0002H12L18.29 22.2902C18.68 22.6802 19.31 22.6802 19.7 22.2902C20.09 21.9002 20.09 21.2702 19.7 20.8802L4.12 5.29021Z"
  />
</template>
