<template>
  <path
    d="M21.75 17.0002C21.75 16.7802 21.72 16.5802 21.69 16.3702L22.53 15.6402C22.71 15.4802 22.75 15.2202 22.63 15.0102L22.04 13.9902C21.92 13.7802 21.67 13.6902 21.45 13.7702L20.39 14.1302C20.07 13.8602 19.71 13.6502 19.31 13.5002L19.09 12.4102C19.04 12.1802 18.84 12.0102 18.6 12.0102H17.42C17.18 12.0102 16.98 12.1802 16.93 12.4102L16.71 13.5002C16.31 13.6502 15.95 13.8602 15.63 14.1302L14.57 13.7702C14.34 13.6902 14.1 13.7902 13.98 13.9902L13.39 15.0102C13.27 15.2202 13.31 15.4802 13.49 15.6402L14.33 16.3702C14.3 16.5802 14.27 16.7802 14.27 17.0002C14.27 17.2202 14.3 17.4202 14.33 17.6302L13.49 18.3602C13.31 18.5202 13.27 18.7802 13.39 18.9902L13.98 20.0102C14.1 20.2202 14.35 20.3102 14.57 20.2302L15.63 19.8702C15.95 20.1402 16.31 20.3502 16.71 20.5002L16.93 21.5902C16.98 21.8202 17.18 21.9902 17.42 21.9902H18.6C18.84 21.9902 19.04 21.8202 19.09 21.5902L19.31 20.5002C19.71 20.3502 20.07 20.1402 20.39 19.8702L21.45 20.2302C21.68 20.3102 21.92 20.2102 22.04 20.0102L22.63 18.9902C22.75 18.7802 22.71 18.5202 22.53 18.3602L21.69 17.6302C21.72 17.4202 21.75 17.2202 21.75 17.0002ZM18 19.0002C16.9 19.0002 16 18.1002 16 17.0002C16 15.9002 16.9 15.0002 18 15.0002C19.1 15.0002 20 15.9002 20 17.0002C20 18.1002 19.1 19.0002 18 19.0002ZM14 11.2602V6.00024H17V10.0002H19V5.00024C19 4.45024 18.55 4.00024 18 4.00024H14C14 3.45024 13.55 3.00024 13 3.00024H6C5.45 3.00024 5 3.45024 5 4.00024V19.0002H4C3.45 19.0002 3 19.4502 3 20.0002C3 20.5502 3.45 21.0002 4 21.0002H12.26C11.47 19.8702 11 18.4902 11 17.0002C11 14.6202 12.19 12.5302 14 11.2602ZM10 12.0002C10 11.4502 10.45 11.0002 11 11.0002C11.55 11.0002 12 11.4502 12 12.0002C12 12.5502 11.55 13.0002 11 13.0002C10.45 13.0002 10 12.5502 10 12.0002Z"
  />
</template>
